Copyright: (c) 1995 by PowerBBS Computing and James Carr


Contents
 PowerBBS Config

The configuration program is what you will use to change the various options and settings for your BBS.  The installation program created an icon in your PowerBBS program group to start this program and automatically load POWRBBS.DAT.  This file is already set up with defaults, most of which should work just fine for you.   For more information on Config see Overview.

Registration Information

Modem Information

Node Specific Setup

Display Screens

File Locations

Options

Security

Misc Data Files Setup

Languages

Messages

Files

Menus

PowerBase

Call Back Verifier


Registration Information

Note:  If you are a registered PowerBBS Sysop, be very sure to enter the Sysop Name and Registration Number exactly as they are printed in the front of your manual.  You cannot vary the spelling one bit from what you supplied to PowerBBS when you registered the software.

BBS Name

This is the name of your BBS. It will be displayed to your callers immediately after they connect to your BBS.

Sysop Name

This is the name that will appear to your callers as the sysop. It is also the name upon which your serial number is based when you register the program.

When you purchase PowerBBS you will be required to select a Sysop Name.  If you have registered PowerBBS you must use the SysOp Name exactly as it is printed on the sheet provided with your package.

Registration #

This is the exact registration number as given to you by PowerBBS. If this number does not work, first check that the number given to you on the printed sheet matches exactly what the PowerBBS screen tells you it read.  Also be sure the SYSOP NAME is used exactly as it is printed on the sheet.  If all else fails contact Russell Frey on the PowerBBS Support BBS.


Modem Information

Setting up your modem can be one of the most complicated things you will have to setup with PowerBBS.  Luckily we have provided an entire collection of pre-configured modems.  Just click Select Modem to choose from them sysop contributed modem strings we have available.  We have also devoted an entire chapter in the manual to configuring your modem.  You should read that chapter before putting your BBS onlin.

Be sure before you use advanced options such as FAX that your system is all working!  You don't want to be tracking two problems at once!

Select Modem:

This option allows you to pick from hundreds of pre-defined modem initialization strings as reported by sysops.   After you select a modem, the setup for that modem will be automatically entered into the modem setup screen.  Be aware that some modems have many entries as there are different setups available for these modems.  If PowerBBS has a problem with one of these setups, try another

Port Name:

Select the communications port you would like this node of your PowerBBS to receive information through. Local Only nodes   this set to COM0 which means no communications port is used.

In addition to setting the comm port you need to tell PowerBBS what type of node this is, select one of the three:

Modem: signifies a dial-up modem node (or local node if you use com0)

Telnet: signifies an incoming Telnet node (requres add-on DLL)

PowerAccess/Network: signifies an incoming PA node for users on Network or via Internet

Modem Command (1):

This will be the first initialization string that is sent to the modem as PowerBBS prepares to accept calls. This string should be used to reset your modem. For most modems this is ATZ.

Modem Command (2):

This is the second initialization string that is sent to your modem as PowerBBS prepares to accept calls. Read the chapter on modems for more details. However, at the very least this string should contain AT&C1&D0H0.

Off-Hook String:

This string will place the phone line off the hook, much like picking up the receiver of your telephone. PowerBBS will use this string whenever it needs to prevent callers from logging on to your BBS. Such times include local log-ons by the sysop, events, and taking a node off-line. This string is usually ATH1.

Hangup String:

This string will force the modem to disconnect the line. This will be used to hang-up on impolite callers that can tie up the lines. It is usually ATH0.

Open Modem At:

PowerBBS provides serial I/O support for speeds up to 57,600 baud. Choose the highest baud your modem will support. Do not select a baud that is higher than what your modem supports. The results may be unpredictable. All this is discussed in more detail in the section on modems.  If you are using the fax options of PowerBBS, you must set this entry no higher than 19200.

Minimum Baud To Logon:

Select the lowest baud rate you will allow callers to use on your system.

Lock in the Open Max Baud Rate:

If you check this box, PowerBBS will always send all data to  the modem at the highest selected speed. This is discussed in more detail in the section on modems.

Answer by Software (TRUE) Ring Detect:

PowerBBS can receive calls in one of two ways. First, it can wait for your modem to send the word RING when a call is detected. PowerBBS will then send the modem answer command (ATA) and answer the call. This is the preferred method for PowerBBS. Check this box to use this option. Make sure that your Modem Command (2) setting has ATS0=0. This tells your modem not to automatically answer calls.

The second method to answer an incoming call is to let the modem do it automatically.  To use this option, clear this check box. Then modify your Modem Command (2) setting to tell your modem how many rings it must detect before answering. This is usually done with ATS0=1 (answer after one ring).

Close Com Port before a DOS (or Windows) external session:

PowerBBS can pass either a "hot" com port off to a door or close the com port and let the door or external program in turn open it. If you are having any troubles with doors, be sure to try both of these options. Make sure you restart PowerBBS after changing this option in Config.

Use Caller-Id Options:

If you have a Caller ID compatible modem and have subscribed to Caller ID with your phone company, check this option. PowerBBS will write to the activity log the phone number of the incoming call. See the section later in this manual for more information.


Node Specific Setup

The information on this screen should be different for each node that you run!

Node Number:

Choose a number for this node. You may choose any number from 1 through 255.

Temporary MAIL Directory:

This will be the work directory for the compression and decompression of the .QWK/.REP packets. It must be different for each node.  If you don't create a different directory for each node to handle QWK Mail, you run the risk of mixing QWK and REP packets and messing up your message files.  This directory is also used to create the ALLFILES.ZIP file for your callers.  In addition, on PowerAccess connects this directory is used when creating download mail packets.

Temporary File Transfer Directory:

This is the directory used by PowerBBS as a temporary directory during file transfers. It will hold files as they are being transferred.  This directory should be different on all nodes. If it does not exist, the configuration program will create it at logoff.  Do not put any files into this directory, PowerBBS will delete them.

Events Data File:

PowerBBS will look in this event file when PowerBBS loads and will keep track of when an event is scheduled to run. When the appointed time arrives, PowerBBS will again look in this file to find out what program it is supposed to run and then run that event. Events are usually batch files that you run on a nightly basis, such as packing your message files.  You must have a different event data file for each node. Please note that you can edit the event file from this part of Config or from the Events icon on the Main Screen of Config. Events are described in more detail later in this manual.

Path/File to Current Callers Data File:

PowerBBS will place information into this file about the current caller to the system.  Door conversion programs will use this as a source file for current caller information supplied to live (door) programs.  This file must be different for each node.

Path/File to DOOR.SYS Drop File:

This is the location and full name of your DOOR.SYS drop file. This file is used by doors.  This entry must be different for every node. See the chapter on Doors for more details.


Display Screens

Info About Screens:

This section lists the different display screens available on your BBS. Read the chapter on screens for more details on creating these screens. File names listed here must not have extensions. You can have three different types of display files for each item listed here: ASCII, ANSI (color), and GUI (PowerGen). The three types of files are denoted by the last character of the filename. In this screen you should enter the name of the ASCII file, which is simply the name of the file. Later, when you create color and GUI versions of these files, you must add a C or a P to the file name when you save it. The result will be that you have three versions of the same display file.

For example, you may have three versions of the Begin Download screen. The default name for this file is DLOAD. If you choose to have ASCII, ANSI and GUI versions of this file, they will be named as follows:

DLOAD  - 	ASCII (notice this is the same names as entered in Config)

DLOADC - 	ANSI

DLOADP- 	GUI (PowerGen)

Once you have the programs to actually edit the screens, all you need to do is click the buttons to the right of the filename in Config to edit them.

PowerAcccess callers:

PowerAccess callers will not see most of the screens. This is because PowerBBS itself handles the display of that information.  In order to create a PowerAccess version of GUI screens you will need PowerGenerator. Name the file with the same naming convention described above using a P for PowerAccess. For example, you might have three versions of your Logoff screen: GOODBYE, GOODBYEC, GOODBYEP.

Path\Filename of ASCII and ANSI Editor:

This entry is only used by the configuration program. Place the full path and file name of the

program you are using to edit your ASCII and ANSI screens.  When you click the Edit Ascii or Edit Ansi buttons to the right of the file names, this editor will be invoked with the given file.  The most popular ASCII/ANSI editor is TheDraw.  You can download this program from the support BBS if you do not already have it.

Path\Filename of GUI Editor:

This entry is only used by the configuration program. Place the full path and file name of the

program you are using to edit your GUI screens.  When you click the Edit GUI buttons to the right of the file names, this editor will be invoked with the given file.  The most popular GUI Editor is PowerGen.


Ansi Screens

Info About Screens

The files listed on this screen are for ASCII/ANSI callers only.   PowerAccess callers will never see these screens.

Begin a download screen:

This file is displayed to the caller before a beginning a download.  That is right after they press the letter on your ASCII/ANSI menu for a download.

Begin an upload screen:

This file is displayed to the caller before beginning an upload.  That is right after they press the letter on your ASCII/ANSI menu for an upload.

Bad ratios screen:

This file is displayed to callers when they try download a file, but are not permitted to do so because they have not met the ratios you have specified for their security level.

Bulletins Menu:

This screen is displayed to callers when they choose to Read Bulletins. It is also displayed to the caller if you have checked Display Bulletins at Intro, and there are new bulletins for the caller to see. It contains a list of the bulletins on your system. Be sure to number the bulletins to match the bulletin numbers indicated in the Bulletins Setup (in Misc Config Section of Config).

Chat (ROOMS) Help Screen:

This file is displayed to callers when they enter teleconference.

Enter SYSOP Chat Screen:

This files is displayed to the caller when she enters sysop chat mode.

Exit SYSOP Chat Screen:

This files is displayed to the caller when she exists sysop chat mode.

Personal RATIOs Screen:

This file is shown to the user after she has either completed a file transfer or selects Your Stats command.  If you do not use ratios you can leave this entry blank or display any information you want after a transfer is complete.


Ansi Screens 2

Info About Screens

The files listed on this screen are for ASCII/ANSI callers only.   PowerAccess callers will never see these screens.

List of Forums Available:

This screen will show the caller the forums that are available for her to join when she selects Area Change or chooses to change areas while reading messages. It should contain a list of the forums (areas) on your BBS with the appropriate forum numbers.

List of DOORS Available:

If you are running doors on your BBS this screen will display the names of the doors and the numbers you specified in the Live Programs Data File. You must manually edit this display file whenever you add or remove a door. This screen is displayed when the caller chooses the Live Programs or Doors command in your menus.

Baud Rate not High Enough:

This file is displayed to a caller who connects to your system with a lower baud rate than you have specified in Config under Modem Setup.

Monitor Selection Screen:

This file is displayed when a caller is selecting her monitor type either as a new caller or when using Menu Command Update Settings.

Sysop Not Available for CHAT:

This file is displayed when a caller chooses Menu Command Page the Sysop and either the sysop pager bell is off or you do not respond to the page. The caller is asked if he wants to leave a messages to the sysop after seeing this screen.

List of Questionnaires Available:

This screen displays the names and numbers of the questionnaires you have entered in the Questionnaire Data File in Config under Data File Locations. You must manually update this file whenever you add or delete a questionnaire. This file is displayed when the caller chooses Menu Command Questionnaires.

Read Mail Help Screen:

This file is displayed to the caller when he selects ? from the Read Messages menu.

Read Mail Commands Available:

This file is displayed to the caller when he chooses Menu Command Read Messages. It should display the list of commands available in the Read Mail Sub-Menu. The screen that comes with PowerBBS contains a complete list of these files. You may choose not to display some of these commands to your callers if you think it may be too confusing for them. However, these commands will still be available.

User Statistics Screen:

This screens displays the caller's current statistics and standings. This file is displayed automatically to the caller if Display Stats at Intro is checked in Config under Options #1.  This file is also displayed if the caller chooses Menu Command View Statistics. This file usually contains a lot of MACROs. You may need to save the ANSI version of this file several times with various Maximum Line Lengths to get it to display properly. See the chapter on screens for more details.

Update User Statistics Screen:

This file displays the caller's account information such as address, phone number, etc. This screen is displayed to new callers to confirm the information they have entered. It is also displayed when the caller chooses Menu Command Update settings. This screen contains several MACROs to show the caller the current settings he has entered.


Ansi/GUI Screens

The files listed on this screen are for ASCII/ANSI and PowerAccess callers.

Birthday Screen:

This screen is displayed to a caller if she logs-on on her birthday and Track Users' Birthday is check in Options.

Credits Used Up:

This screen is displayed to callers when they run out of credits. You should include information on this screen on how your callers can purchase more credits.

Access Level Has Expired:

If you are setting a security level expiration dates for your callers, this screen is displayed the first time they log on after the expiration date has passed. It should include information about how to increase their security level.

Hello Screens:

You may have up to nine HELLO screens with file names HELLO1 to HELLO9. These screens are displayed after the Stats screen (see the chapter on screens for exact order in which the intro screens are displayed) .The sequence of HELLO screens must be consecutive. If a filename is not found, the hello stops. In other words, you cannot have just HELLO1 and HELLO3. PowerBBS will stop after the first one. You would need to either rename HELLO3 to HELLO2 or create a HELLO2 screen.

Opening (Welcome) Screen:

This screen is shown at logon, before the caller is asked to enter his name. This file is usually a screen displaying your BBS name and logo.

New User Screen:

This screen is displayed to a new user at logon, right before asking the caller if she would like to sign on as a new user. This file should contain a brief description of your BBS.

30 day Expiration Level:

This screen is displayed to callers whenever they log on within 30 days of the date you have set for their expiration date to expire. This file should include information on how to extend this date on your BBS.


File Locations

Path\Filename to bulletins Data File:

Bulletins may be ASCII, ANSI, or PowerGenerator files. They can provide explanatory information, rules listings, announcements or just about anything you like. See the section on Bulletins for more  information.

Path\Filename to Downloads Security:

This file allows you to restrict callers to downloading certain files and types of files by security level.   Be sure to put the most restrictive entries first and the least restrictive entries last. When a caller attempts to download a file, PowerBBS looks in this file to see if that file meets one of the entries you have listed. If it does, PowerBBS checks the security level. If your caller has a security level high enough to download this file, he is permitted to do so. PowerBBS will stop looking when a file matches one of these entries, it won't look for any other matches. This file is also used to determine whether a caller is able to preview a file when using PowerAccess.  See File Securities.

Path\Filename to Forum Data File:

Contains the information on all of the forums on your BBS.  When you click on the Forums icon from the main screen of Config you will be able to edit this file.  You should use the same file name for all nodes of your BBS.  See Forum Folder Setup.

Path\Filename to Invalid User Name List:

If you want to prevent your callers from using certain names, place those names in this file.  When a new caller logs on, PowerBBS checks this file for the name he gives. If that name is found, PowerBBS will force him to choose a different name.  See Bad Names.

Path\Filename to Language Data File:

If you want to allow your callers to choose between different languages, you must first check that option in Config  under Options #1. You must then create different language files. Finally, list those language files in this file. See Editting Languages.

Path\Filename to Doors Data File:

If you intend to offer doors for your callers to play, you must place the batch files to start these doors in this file.  You must use a different file name for each node on your system. See Doors.

Path\Filename to List of FREE Files:

When a caller downloads a file from your system, his download byte count and download files count is increased.  If you have certain files or directories that you wish to offer for "free," list them here.   PowerBBS will not charge the files listed here against the caller's download ratios.  See Free Files.

Path\Filename to Questionnaires Data:

This file holds all of the information about the questionnaires on your BBS.  See questionnaires.

Path\Filename to Security Data File:

This file contains the information about the various security levels on your BBS. This file should be the same for all nodes on your BBS. The only exception is if you have a node with a slower modem.   You may want to use a different set of security information so you can give callers to this node more time on-line. See security levels.

Path\Filename to Users Database:

This file holds the information about your callers. It must be the same for every node on your system.

Path\Filename to Uploads Security:

Holds the information on what directories, file types and  individual files you want your callers to access during uploads. This way you can restrict uploads in certain areas, just like with the downloads.  See File Securities.

Path\Filename to Sysop Paging Data File:

Holds the information on when the sysop is available to be paged.  During these times, if the page bell is on the user can page the sysop.  When it is NOT these times the caller can NEVER page the sysop.  See Page Times.

Path\Filename to File Groups Data File:

Holds the names of the file groups available on your BBS.  See File Folder Groups Setup.

Path\Filename to File Listings Data File:

Holds the names of the file listings under individual file groups available on your BBS for viewing and downloading from.  See File Folders Setup.


File Locations 2

Path\Filename of New Users Questionnaire:

When a new caller logs on to your system, PowerBBS will force them to answer the questionnaire listed here. See the section on questionnaires for more details.  Don't include this questionnaire in your Questionnaire Data File. Otherwise, your callers may answer the same questionnaire twice: Once when they call the first time and later by accident!

Path\Filename of Answers to New Users Questionnaire:

This file will contain the answers to the questionnaire listed above.

Path\Filename to the Restricted Uploaded Files List:

This is the file that will contain a listing of restricted uploads to your system. It will not list files enclosed within messages.

Path\Filename of UPLOADS FILES LIST:

This is the file that will contain a listing of uploads to your system.

Path\Filename to list of uploads and who uploaded them:

This file will contain a list of all the uploads to your system. It will tell you who uploaded the file, the date of the upload and the protocol and speed of the transfer. This file is used by PowerBBS to give credit to uploaders when another caller downloads a file they uploaded. This entry must be the same for each node.

Path\Filename to activity log:

PowerBBS keeps track of what your caller does in the activity log. You will need a separate activity log for each node on your system. Use the same file name for each of your nodes! PowerBBS will append the node number to end of this file name automatically. Do not make this file name more than seven characters if your nodes are numbered anywhere from 0-9.  Don't make this file name more than six characters if any of your nodes are numbered 10 or higher.

Path\Filename to file that tracks number of calls to the BBS:

This file contains the cumulative history of your BBS such as the number of calls to the system. It should be the same for every node. Do not place this file on a RAM disk.

Path\Filename to node\chat file #1:

Path\Filename to node\chat file #2:

Path\Filename to node\chat file #3:

Path\Filename to files used track callers to the system and communicate among different nodes.  These MUST be the same on all your nodes.


Directories

Directory containing menus and POWS:

This is commonly referred to as your source directory.  Most sysops use the same directory for all nodes, however there are times you may want to use different source directories for different nodes. This directory contains all of your menu files (*.MNU) and PowerLang files.

Directory containing index of users:

This is the path of the directory which will contain your index files. The index files are used by PowerBBS to quickly find a user when she logs on.

Directory containing Access Screens:

This commonly referred to as your security directory. This is where display screens involving security levels are stored. See the chapter on screens for more details.

Directory containing Restricted Uploads as well as message file enclosures:

When a caller uploads a file, it is usually placed in the Uploads Directory for that forum (see the chapter on files). If you have checked Restrict All Uploads in Config under Options #1, all uploads will be placed in this directory. Furthermore, if a caller enters a description for an upload that begins with an asterisk (*), PowerBBS will place the upload in this directory. Finally, all files enclosed within messages are placed in this directory.

Directory containing Files Uploaded to BBS:

Directory where uploads are placed after a user uploads them.  This directory will only be used if you allow others to download new uploads (and not restrict uploads for the sysop to view only).


Security Levels Setup

This lets you set up the various access levels of your users.  There is a lot of information on this screen and it determines what your users will be able to do.

In order to give a user a certain security level, you must first have an entry for the level.  Otherwise, PowerBBS wouldn't know what to do with the user!

Also See Security Level Defaults

Level:

The security access level for this line.

Time:

The number of minutes per day this user may be online to your board.

K-Limit:

The number of BYTES users with this access level may download per day.  There is no restriction on uploads!

Month-Limit:

The number of MEGABYTES users with this access level can download per month.

Msgs Ratio:

The minimum number of messages a user must leave in order to download.

100 = 1 message left per time on.

 50 = 1 message left per 2 times on.

 25 = 1 message per 4 times on.

 10 = 1 message per 10 times on.

Files Ratio:

The minimum number of files a user must upload in order to upload.

100 = 1 upload per download.

 50 = 1 upload per 2 downloads.

 25 = 1 upload per 4 downloads.

 12 = 1 upload per 8 downloads.

Bytes Ratio:

The minimum number of bytes a user must upload in order to upload.

100 = 1 upload byte per download byte.

 50 = 1 upload byte per 2 downloads bytes.

 25 = 1 upload byte per 4 downloads bytes.

 12 = 1 upload byte per 8 downloads bytes.

Max Int Msgs:

The maximum number of Internet messages a caller may leave/receive per month.


Security Level Defaults

Security Level Given to NEW Users:

This is the default security level given to all new callers.

Minimum Access Level Needed To:

Delete a Message:

This is the minimum security level needed to delete a message. A caller can only delete messages to or from himself. Most sysops set this number to zero.

Reply to a Message:

This is the minimum security level needed to reply to a message. Replying to a message is an option from the Read Mail sub-menu.

ANSI: Abort Intro:

This is the minimum security level needed for a user to abort the display of the hello screens when logged in under ascii or ansi (not PowerAccess).

ANSI: Intro File Search:

This is the minimum security level needed for a user to be able to search for new files when logged in under ascii or ansi (not PowerAccess).

Enter an Internet Message:

This is the minimum security level needed for a user to post an Internet message.

(PowerAccess) Chat:

This is the minimum security level needed for a PowerAccess caller to make use of the multi-chat window (to talk to others on-line).

(PowerAccess) Preview a File:

This is the minimum security level needed for a PowerAccess caller to preview files on your BBS.


Data Files Setup

Bulletins

Credits

Doors

Events

Questionnaires

Languages

Page Times

Bad Names


Bulletins

Bulletins are commonly used to announce information to your caller, provide rules for your BBS, list upcoming events, or even display the high scores from your doors.  If you are running an adult board or a pay board, use the bulletins to explain how to gain higher access to your BBS.

Blt1	ASCII file for a Bulletin file called Blt1

Blt1c	ANSI version of the same bulletin

Bltp	PowerGenerator version of the same bulletin

Description of the Bulletin:

Enter a description of the Bulletin.  This description is used in PowerAccess to create a listbox of your various bulletins.

Path\File to the Bulletin on Disk:

Enter the full path and file name of the bulletin.  You can have three different types of files for each bulletin like with most other screens:  ASCII, ANSI, GUI.  For example, if you had a bulletin for adult access, you might call the ASCII version of that bulletin ADULT, the ANSI version ADULTC, and the PowerAccess version, ADULTP.  The entry you would place in the Bulletin Data Files is C:\POWRBBS\BLT\ADULT.

While PowerAccess creates a listbox of bulletins based on the descriptions you give, you must edit the bulletins sub-menu for ascii/ansi callers to see what bulletins are available.  See Screens.


Credits

Run a Credit BBS:

Check this option if you want to use a credit system. See the section on credit systems for more information.

1 credit is given to an uploader of a file for every x bytes downloaded:

If you want to reward your callers for uploading files (you should), enter a number here. If

you want callers to earn one credit per minute the upload takes, enter a one here. If you

want your callers to earn one-half credit per minute the upload takes, enter 2 here (1/2).

0 = never give uploader more credits.

1 = for every byte of a file downloaded give the uploader a credit.

1000000 = for every one million bytes downloaded give the uploader of those downloaded bytes a credit.


Doors

A door is a term used to describe an external program that your callers will be able to run from within your BBS.  Most often doors are games.  Most BBSs offer at least a few doors such as poker, etc.  Other BBSes run lots of doors including the ever popular Tradewars.  Doors do not have to be games.  Other types of doors are available to take credit card orders, display advertising, and other useful functions.

The one thing that all these programs have in common is that they are separate from the BBS.  This means that you will have to set up PowerBBS to run these programs.  Basically, when a caller runs a door on your BBS, PowerBBS will give up control of the modem and pass it to the door.  The door will then be in control of the modem.  When the caller is done with the door, it passes control back to PowerBBS and your caller picks up on the BBS where she left off.

You cannot just install any old program as a door on your BBS.  It has to be written specifically to work with a BBS.  This means you cannot let your callers run a copy of your Windows Solitaire game!

When PowerAccess runs a door, all other windows will be closed, PowerAccess will then open up an ANSI window for the caller.  When the caller is done with the door, PowerAccess will reopen all of the other windows for the caller.

See the chapter in the manual on DOORS for a complete guide on setting them up for your BBS.


Events

This option will allow you to edit the Event file for that node as entered in Node Specific Information. Be sure to have a different Event Data File for each node. In this screen you will enter the days and times of the events that PowerBBS will run. PowerBBS must be running in order to start an event. You can have as many events for a node as you want.

To add a new event simply fill in the appropriate information in a blank set of fields. To delete an event, click on that event and then click on the Delete button.

The following is a brief description of the options on this screen.

Time:

This is the time that PowerBBS will run the event. Enter this time in military time (00:00 to 23:59). PowerBBS will start this event approximately three minutes before the time entered here on the theory that it is better to be early than late!

SMTWTFS A:

These check boxes indicate the days of the week that PowerBBS should run this event.   You can check as few or as many of these as you choose. The A represents All days.

Description:

This is simply a description of the event for your information. It is not required or used by PowerBBS.

Command Line of Batch File or Program to Run:

PowerBBS will use this entry to run another program or batch file. If an event is a DOS program, it must be started from a batch file. If the event is a Windows program, the command line must be an executable (EXE) file. This entry should contain the full path and file name, including the file extension.

Wait For Event:

If this is check, PowerBBS will wait until a caller logs off before starting an event. If this is NOT checked, PowerBBS will notify and disconnect the caller at the time an even is scheduled to run.

Internet Connection After Event:

Check this for the INTEXP.BAT Internet event.


Questionnaires

This file holds the information regarding the questionnaires available to the user.  It also lists the name of the answer files for each questionnaire.  Questionnaires are text files with particular macros added to them.  The user will see the individual lines of the questionnaire, one at a time and be presented with certain possibilities for an acceptible answer.  I use a questionnaire to update my new users to a registered security level.   A line of this data file will look like...

Path\File to Questionaire	Path\File to Answer File

C:\Powrbbs\work\quest1	C:\Powrbbs\work\answer1

After the user answers the questionnaire the answers are recorded in the ANSWER file.  This is another text file that can manipulated by you or by another program.  The Description field is displayed only to PowerAccess callers. For more information on creation and editing of Questionnaire files, see the PowerBBS User Guide.


Languages

If you want to allow your callers to choose between different languages, you must first check that option in Config  under Options. You must then create different language files. Finally, list those language files in this file.

Languages only have an effect for ANSI callers.  It will not have any effect on PowerAccess connections.

This is used by PowerBBS to enable multi-language support. You can have multiple languages or you can also do slang or any dirivitive.

Ext	Text	Phone

English	(###) ###-####

SP	Spanish	NO

FR	French	##-##-##-##

GR	German	##-##-#####

Extension:

Added to the end of language specific files to differentiate it from the default screens.  For example, if you put FR here, the file HELLO1.FR will be displayed to a user selecting the language (if HELLO1.FR isn't found then the normal screens are displayed).  Also note that the color screen is still HELLO1C.FR.  This extension is optional, but if used should relate to the language specified.

Text:

Descriptive text displayed to the caller.

Phone:

Phone number formatting.  The letters NO in this spot will allow free-form phone numbers.   Like the ones used in Europe.  If all your calls are from the US you should use the (###) formatting codes to force correct data entry.  You can use whatever format you like, but you're limited to 14 characters.

To edit the actual language files see Edit Languages.


Page Times

This option allows you to edit the Sysop Paging Time Data file. It controls the times that PowerBBS will toggle the Pager Bell.  This file may or may not be different for each node.  Most of the time you will use the same file for all of your nodes.

When you start PowerBBS with your Pager Bell on, PowerBBS will use this file to determine when to automatically turn the pager off and on for you. If you start PowerBBS with the Pager Bell off, PowerBBS will ignore the settings in this file. You can have as many entries in this file as you choose.

Time From:

This is the time that PowerBBS will turn the pager on. Enter the time in  military time (00:00

to 23:59).

Time To:

This is the time that PowerBBS will turn the pager off after turning it on with the above entry.  Enter the time in  military time (00:00 to 23:59).

Valid Days:

These are the days of the week for which you want PowerBBS to toggle the Pager Bell for you. You can check as many days of the week as you choose. Use A for All days.

.WAV File:

If your system is capable of playing WAV files via a sound card or the special Windows sound driver, you may use a WAV file for a custom pager bell. If you specify a valid path and file name to a file here, PowerBBS will use this file to get your attention when a caller pages you. Otherwise it will use the default beep on your computer.


Bad Names

This contains a list of the names you do not want used on your BBS.  There are many prelisted words already here, and you may add to them at your option. Examples of bad user names might be any keywords that you don't want used, foul language, control codes or just specific user names.

+++

-PC

ABUSER

CC

DARTHVADER


Edit Languages

Also See Language Data File.

The language editor allows you to edit the internal text of PowerBBS that is displayed to your ASCII/ANSI callers.   It does not affect your PowerAccess callers.

This is the Language Editor for PowerBBS. Even if you are not using multiple languages, you can still edit the language file for your BBS. You can change nearly all of the prompts that PowerBBS displays to the caller. We have done our best to make these entries as clear as possible.

Once  you are editing a file, you can use the scroll bars or PgUp and PgDn to move up and down the list. When you see an item that you wish to change, type the information in the appropriate text box.   The defaults for each phrase you can edit are listed in gray.


Options

General Options

General Options 2

ANSI Options

ANSI Options 2

PowerAccess Options


General Options

Allow names that begin with a non-letter:

Checking this box will allow callers to enter any name they want . Any character is allowed. If it is left blank the name must begin with a letter.

Allow one word names:

If want to allow your callers to log on with simply a one word name (Tuirc, Babydoll) instead of forcing them to enter two names, check this option. This option has no bearing on the use of anonymous names (handles).

Allow HANDLES or ANONYMOUS Names:

If you check this option, PowerBBS will ask your callers for an anonymous name when they log on the first  time. Anonymous names are also called handles.

Only allow the sysop to view new uploads (not available to callers):

Check this box, if you want PowerBBS to keep new uploads off-line until you manually place them on-line. If this box is checked, all uploads are sent to the \RESTRICT directory, and are listed in the Restricted Files Listing. If you leave this option clear, your callers will be able to download the uploads to your system..

Ask/Store users gender information:

If you want to track the sex of your users, check this option.

Maximum number of k bytes local hard drive must have in order to access file uploads:

Put the number of Kilobytes you want to have on your hard drive before you stop uploads. Examples are:  200 = 204,800 bytes. 5000 =5,120,000 bytes (5 Megabytes).

Run a CLOSED BBS?

Most BBSs allow callers to sign on as new users when they call the first time. Some companies run what is called a closed BBS where no callers are allowed on-line until the Sysop has added them to the user database. If this is the type of BBS you need, check this option.

Closed BBS Questionnaire Path/Filename:

If you are running a Closed BBS, callers will have to answer this script file questionnaire when they call the first time. It is up to you to add them to the user database to give them access to your BBS.

Closed BBS Responses Path/Filename:

The answers to the Closed script file above are stored here.


General Options 2

Test new uploads:

Check this box if you want PowerBBS to check each file that your caller's upload to your BBS. You must have a batch file and upload checking software to test upload. See the chapter on files for more information.

Path\Filename to Test Batch File:

This is the full path and filename for the batch file used to test uploaded files. You must have a different batch file for each node of your BBS.

Running a *DOS* based mailer:

Check this box if you are running FrontDoor or another front end mail software that will answer the phone before PowerBBS. If checked, PowerBBS will run the EVENT.BAT  file listed below instead of waiting for callers. For more information on FrontDoor and other mailers, see the section on FrontDoor.

Path\Filename to Mailer Batch File:

This is the full path and file name to the batch file used to start FrontDoor or other mailer.

Path\Filename to file to store baud information:

This file will be generated by FrontDoor or other software. You have to tell PowerBBS where to look for it. For more information on this topic see the FrontDoor section.

Allow ANSI/ASCII Callers:

If you want to accept ASCII and ANSI callers to your system, check this option.  If you only want to accept PowerAccess callers, do not check this option.  In this case, the user will be able to first download PowerAccess before they are logged off.

If you do not allow ANSI/ASCII callers, when they do not download PowerAccess and try to logon they will be prompted with the following file:

This file will be displayed after an ASCII/ANSI connect upon which a user tries to log onto your BBS (after passing the PowerAccess download).


Ansi Options

These options apply only when in ASCII or ANSI mode.  They have no effect on your PowerAccess callers.

Logon Options:

Display who is on-line at logon?

If turned on, WHO IS ON-LINE command with a list of current callers to your system will be displayed.

Allow the selection of a language at logon?

If you only want to run an English Language system clear this box. If you wish to offer your callers options of different languages, check this box. You must provide different language files for your callers. See languages.

Display User Statistics at logon?

If you want PowerBBS to automatically display the Stats screen to your callers when they log on, check this option. This will be the next to last screen that a caller sees before the Main menu.

Show (New) Bulletins at logon?

If you want your callers to be notified of new bulletins when they log on, check this option. If you don't check this option, your callers will have to check the bulletin menus themselves to look for new bulletins.

Force Users to Answer the following User Information:

Address:

City:

State:

Zip Code:

Computer Type:

Home Phone:

Data Phone:

Business Phone:

Fax Phone:

Users' Birthday:

If you want PowerBBS to force the user to give this information to be saved in their user records then turn these on.  If they are off, PowerBBS will just set these to blank.


Ansi Options 2

These options apply only when in ASCII or ANSI mode.  They have no effect on your PowerAccess callers.

Allow ANSI and other ESC codes to be put directly in messages:

Some mail networks allow ANSI color codes to be sent in messages. For the systems that aren’t setup for it, this can cause problems. If you are going to allow this type of message, check this box.  Also, ANSI and ESC codes will not display correctly in the PowerAccess read mail window.

Permit non-standard characters in messages:

If you are planning on having echoed mail conferences on your system, you should find out if the extended ASCII graphical characters are allowed in messages. If they are not, you should clear this option.   Also be aware that PowerAccess probably won't display these characters correctly, unless the user is using the terminal font.

8 letter name to be used for QWK mail packets:

QWK mail requires an eight character file name to use with QWK and REP packets that identifies your BBS. PowerBBS and QWK mail programs will automatically enter the QWK or REP extension to the name you give here. This entry must be eight characters long using letters only. Do not place an extension on this file name. Make sure that this entry is the same for each node.

Maximum # of messages per QWK packet:

This is the maximum number of messages that can be included in a QWK mail packet.

Maximum number of lines when posting a message with ASCII/ANSI editor:

Enter a number between 50 and 250. A setting of 200 lines is used in many places. This restricts the number of lines that can be entered in a message.

Tagline for PowerNet (QWK-Net):

If you are going to be using the .QWK network capabilities, this line will be automatically added to any messages that are exported to callers with QWK-Net status. For more information on this subject see the section on PowerNet.

Date Format:

Chose from DD-MM-YY or MM-DD-YY format for dates on your system. This allows changing from American to European style dates.

Minutes Idle before Auto Logoff:

The number, in minutes a caller can be idle before the BBS logs them off automatically. If this is set to 0, the caller can be idle indefinitely (not recommended).

Command to TEST Non-Zip Files:

This line is the DOS style command line to be used for testing compressed files. You must have the proper compression software on your system for this to work properly. This command line is used with Menu Command 28, Test a File. It allows your callers to test a file before downloading.

Command to VIEW Non-Zip Files:

This  line is the DOS style command line to be used to view which files are inside of a compressed file. If you are using ZIP as the default file extension, PowerBBS will use its internal ZIP support to display a list of the files inside of a ZIP. This setting works with Menu Command 30, View Inside a Compressed File. If you are using a different compression type, you will need another program to display the contents of this file. PowerBBS has built in support for Aviewcom, a shareware program to view compressed files.


PowerAccess Options

Save preview files in preview directory after creation:

If you check this option, PowerBBS will keep any graphics preview files created when your callers request a preview. Each preview  (*.PRE) is about 5-10K in size. This setting has no effect on the option in the File List Manager to create previews.

Preview Directory:

When PowerBBS creates a graphics preview to be sent to a PA caller, you have the option of keeping those files on disk. The next time a caller requests a preview of that file, PowerBBS will not have to create it again. Similarly, you can use the File List Manager to generator previews of graphics files. This entry is the directory in which you want them stored.

Path\Filename to POWRACC.EXE (for local logons):

Enter the full path and file name of where you have PowerAccess installed (usually  \powracc\powracc.exe). This entry is used to start PowerAccess from the Local Screen.

Directory containing PowerGen Sounds:

This directory is used by both PowerBBS and PowerGenerator (purchased separately) to locate and store sound files  (WAV, MID) used with PowerGenerator screens (c:\powrbbs\pgsounds).

Directory containing PowerGen Pics:

This directory is used by both PowerBBS and PowerGenerator (purchased separately) to locate and store bitmaps and icons used with PowerGenerator screens (c:\powrbbs\pgpics).

Directory containing PowerGen Screens:

This directory is used by both PowerBBS and PowerGenerator (purchased separately) to locate and store PowerGenerator screens (c:\powrbbs\screens).

Copy files to transfer directory before sending?   (Needed for CD-ROMS)

Since PA callers use a proprietary transfer protocol that functions differently than other standard protocols, it requires a new setting. If you are using a CD-ROM to offer files for download, check this option. Otherwise, leave it unchecked and monitor the speed performance yourself as it will vary by system.

Allow the downloading of PowerAccess on Non-PowerAccess connects:

If you want to offer PA to your callers automatically when they log on, check this option. Before your opening screen is display, the caller will see a message about PowerAccess and have the option to download it. This does not apply to PA callers.

Path\Filename to PowerAccess ZIP File (for download both on ANSI and OLD-PA connects):

This is the location of the PowerAccess archive that your callers will be able to download if you check the above option.


Forum Folder Setup

Forum Name:

This is the name of this forum that will be displayed to your callers.

Forum Sub-Sysop:

This is the name of the sub-sysop for this forum that will be displayed to your callers when the enter this forum. You must still manually update this person's security level if you want him to have sysop access on your BBS.

Path/Filename to Message Base Database:

This file stores the actual messages for that forum. This file name must be unique for each forum.

Path/Filename to Forum News Display Screen:

This file is displayed to the caller when he joins that forum. This file should contain an explanation of the types of messages you expect in that forum. This file should be different for each forum. Consider naming these files in the same manner in which you name the message base: NEWS00, NEWS01, etc.

Is this an *INTERNET* (Private Mail) Forum:

If this forum is your designated private mail internet forum (where private internet messages are sent and received) turn this on.

Is this an *INTERNET NEWSGROUP* Forum:

Set this if this forum is to hold an internet newsgroup.

Make all messages PUBLIC (No private mail):

Check this option if you want to force all messages in this forum to be public. If you check this option and a caller tries to enter a private message, it will be moved to forum 0. Internet newsgroup forums must have this option checked. You should clear this option for the forum you will use for personal Internet mail. This option can never be checked for forum 0.

Make all messages PRIVATE (No public mail):

Check this option if you want to force all messages in this forum to be private. If you check this option and a caller tries to enter a public message, it will be moved to forum 0.  You should set this option for the forum you will use for personal Internet mail. This option can never be checked for forum 0.

Allow Anonymous Names (Handles) in Posted Messages :

If you check this option, PowerBBS will ask your callers for an anonymous name when they log on the first  time. Anonymous names are also called handles. If you want your callers to be able to use their handle in a given forum, check this option. You must check this option if you want to allow your callers to use handles!

Allow ALL Those with at least the following security level access to forum:

If you check this option, all security levels with the given minimum security level will have access to this forum automatically.

Select Additional Security Levels Allowed Into Forum:

Select the security levels to whom should have access to this forum.

Pack:

Allows the packing of the message base.  By packing your message base you can get rid of old messages, messages that have been around for a certain number of days, etc.

Add a Forum:

Allows you to add a new forum.

Delete Forum:

Allows you to delete the current forum.

Restart Msg Base:

This will automatically delete ALL the messages in the current forum.  After doing this, the forum will have NO messages.  You cannot bring them back once you perform this function.

Use Private Upload Directory

Check this option if you want this forum to accept private uploads. If the caller is in this forum when he lists files or uploads a file, the next two settings will be used. This setting overrides the standard uploads directory when the caller is in this forum.

Private Upload Directory

Enter the directory in which the private uploads for this forum will be saved.

Private Upload File Lists

Enter the name of the file list that will store the private uploads.


Menu Setup

This button starts the Menu Editor. Editing menus is fully explained in the chapter on customizing your system in the section about menus. When you click on this button you will see a list of the menus you have already created for your BBS.

Menu Name:

This is the name of the menu that is displayed to your callers at the bottom of the screen.

Menu Screen:

This the actual file that is displayed to the caller which shows the menu. If you update your menus from here, be sure to update this display file. Also remember to create ASCII, ANSI and GUI versions of this file. Name the file here MENU. Save the ASCII version as MENU, ANSI (color) as MENUC, and GUI as MENUP.

Help Screen:

This is a text file displayed to your callers when they select ? from this menu. It should explain the options available on that menu.

Move to Forum:

If you want PowerBBS to automatically change to a certain forum when the caller enters this menu, check this option and enter a forum number.

Move to Group:

If you want PowerBBS to automatically change to a certain file group when the caller enters this menu, check this option and enter a group number.

List of Commands On This Menu:

A list of all the commands and their descriptions in this particular menu will be displayed.  Once you have selected a command you can edit the particular properties of the menu command.

Properties of menu option:

Letter:

This is the letter your callers must press to choose this menu option.

Command Type:

This tells PowerBBS whether you are adding an option to run a  Menu Command, a PowerLang file, another menu, a PowerBase database, or an ASCII/ANSI DLL.

Actual Command to Run:

This tells PowerBBS what exactly to run based on the command type.  If the command is a PowerLang, this should be the number of the PowerLang to run.  If this is a DLL, the DLL name needs to be in the description field.

Security:

This is the minimum security level your caller will need to access this menu option.

Time:

This entry determines how PowerBBS will charge time when a caller is using this menu option. An entry of 1 means that PowerBBS will charge one minute per minute used in this option. -1 will grant the caller one minute per minute spent in this command. 0 will disable tracking of time on-line while in this option.

If you are running a credit system, this number is used to determine how credits are charged (at one credit per minute). If you are running a credit system, be sure to make Good-bye charge 0 credits or your callers will not be allowed to log off when they run out of credits. You should also make the Comment to Sysop command use 0 minutes so that callers who run out of credits and leave you a message to request or purchase more credits.

PowerAccess callers are all charged one minute per minute on-line. There are no free areas since PowerAccess callers can perform many tasks concurrently.

Description:

This is simply a description of the menu command for your own use.  If this is a DLL, be sure the description includes the actual name of the DLL.

New Menu:

To add a new menu, click this button.

Delete This Menu:

This will allow you to delete a menu.  Be careful that if you delete a menu, you may have other menus which still branch to this deleted menu!


PowerBase Configuration

Database Name:

Enter a description of the database.  This should give some indication of the type of information you are presenting to your users.

Database Path/Filename and Format:

This is the actual path/filename of the database file.  You should also select the type of database format it is.

Menu Path/Filename and Format:

If the particular database has a memo field, this is the actual path/filename of the memo file.  You should also select the type of memo format it is.

View Screen:

Enter the path to the custom view screen for the single record view of this database.  This file does not have to exist before you create the database, you can create it later.  These files are named like other display files in PowerBBS.  Specify the name of the ASCII version of the screen.  If a caller has a color monitor, PowerBBS will look for a file by that name with a C appeneded to it and use that file.  If you have PowerGenerator you can create a PowerAccess version of the scrreen, by appending a P to the file name of this file.  If you want to use the default screen, just press Enter.

Image Directory:

This is the directory that will store images.  In order to use the capability of having a graphic in your database, you must already have a field beginning with BMP.  Your callers will then be able to download the file specified in that field directly from PowerBase.

Order Database  (PowerBase/Order):

If you want this database to be a PowerOrder database, answer yes.  See PowerBase Order.

User Registry Database:

Answer yes if you want this to be the database to be used with teleconference for the user registry feature.  This database must have a field called POSTUSER to work.  Callers will be able to view other caller's registrys by double clicking on their name in PowerAccess chat room, or by typing /R NAME in the ASCII/ANSI mode chat.

Minimum Access to Add to the Database:

Specify the minimum access level your callers will need to add a record to the database.

Maximum # of adds to the database per user:

Enter the number of posts each caller can make to your database (does not effect security levels 150 and above).  Se this number to one for a user registry database.  To prevent callers from posting a record, enter a zero here.

Starting Pow # (ANSI Only):

You can use PowerLang files to control the entry of data into each field.  Each field will have its own POW.  PowerBase will use the number you specify here for field #1.  The POW for field #2 will be one higher.  These POWs must be located in your Source directory.  Even if you don't use POWs for data entry, you must enter a starting POW number.  PowerAccess callers do not use these POWs when editting or adding records.  Use the Text property in PowerGenerator to display a prompt to the caller.

PowerTip:  Make your starting POW number end in one.  For example, 5001.  This way the POWs will be numbered in the same way as your fields: Field 1, 5001.POW;  Field 2, 5002.POW, etc.

Browse Header (ANSI Only):

If you want to use a custom browse header, enter the ASCII version of this file name here.

Sample Browse Header Screen:

A list of PowerBBS Systems

Rec Number	PowerBBS Name 	PowerBBS Number

Browse Item (ANSI Only):

If you want to use custom browse items, enter the ASCII version of this file name here.

Sample Browse Item Screen:

|REC#|	|FIELD:1.....................|	|FIELD:2........................|

Key Path/Filename:

Enter the full path and file name to the index file for this database.  dBASE IV indexes have the extension MDX.  dBASE III index files have the extension NDX.

Key Expression:

Enter a valid key expression for the index.  This is what PowerBase will use to index the file.  Valid expressions can be a single field name or two field names joined by a plus (+) sign: NAME or LAST+FIRST.  You must include the EXACT FIELD NAME.

Tag Name (dbase 4 and FoxPro keys only):

If you are using an index capable of tag names (dBASE IV), enter the name of that tag here.  Valid tag names are the same as valid field names.

Add:

Delete:

To add or delete a database.

Pack:

Packs the database.

Remove Index:

Removes the use of the Index selected.


Caller ID

Enter a list of phone numbers that you do not want to access your system.

IE:

5551111

5551112

5551113

When you have caller-id properly configured, if PowerBBS detects one of these numbers calling your system it will just ignore the call!  The caller will just get a ring and will not be able to access your BBS!!


PowerBase Order

Ask user the following question:

If the user selects this option, charge the following sales tax percent (should be something like 8.5 for 8.5%):

Shipping Options

Description of Shipping Options:

Charge the following Amount:

Payment Methods:

Description of Payment Method:

PowerLang to execute to handle transaction.  ie: CREDIT.POW


Call Back Verifier Configuration

The call back verifier is used to verify that new callers to your BBS are actually calling from the number they say.  This feature is handy to keep out unscrupulous and underage callers. Why?  Because those callers won't want you to know their real phone number!

The call back verifier built into PowerBBS will only work with US style phone systems.   Due to the variety and complexity of phone systems (and numbers) in other countries, we currently do not have any plans on changing this restriction.

Activate the Call Back Verifier:

If you have the Professional version of PowerBBS, you must check this option for the CBV to operate. If you do not have the professional version, this option is not used. See the section on CBV for more information.

Dial a 1 + AreaCode to make long distance calls:

If you have to dial a 1 before making a long distance call, check this option.

Always dial the area code (even if area code is same as BBS):

If checked, PowerBBS will always dial the area code of the phone number when making a call.

Dialing prefix before dialing any number:

Enter any prefix that PowerBBS should call before making a call (it could be something like 8 that you might have to dial to reach an outside line).

Area Code of the bbs (your area code):

Enter the area code your BBS is in.

Pulse Dialing / Tone Dialing Out selection:

Select the type of dialing out method.

AREA CODES

Dial only numbers in the BBS Area Code:

If turned on, long distance numbers will not be called.

If the above option is set to try, you can make exceptions to the following area codes.  Allow the dialing of the following area codes even though above option is on:

You can list area codes you do want to call (even though you selected not to call long distance numbers).

NUMBERS NEVER TO CALL

List of ####### numbers not to call

List of exchanges (the first ###) numbers not to call

List of area codes not to call

SECURITY LEVELS FOR WHICH THE CALL BACK VERIFIER WILL RUN

When users of the following security levels log on, the call back verifier will execute:

Select the security levels for which the call back verifier should run.  If a security level on an incoming call is listed, the call back verifier will run.

If the user is successful with the call back verifier, raise their security level to:


Files

File Group Setups

File Restrictions

File Manager


File Folder (GROUP) Setup

PowerBBS files are organized in groups.  Under each group you have a set of file lists.  Before you can begin adding file lists (to make files available on your system), you first need to name the file groups on your BBS.

On-Line?

If you want the files in the group available to your caller check this.  Normally this should be checked, however if you have a cd-rom that you may take off-line this will make it very easy to remove/add the cd-rom to your system when you want.

File Group Name:

Enter a general description or name of the group of files.

Is this a CD-ROM Group:

If this group is based on a cd-rom check this option.

How to delete a group:

Click the delete button

How to add a group:

Simply find where the group name is empty and type in a new group name.


File Folders Setup

Group ComboBox:

List ComboBox:

Description:

Path\File to File Containing a List of Files:

Directory which actually contains the files:

Select Security Levels that may view and download from this list:

Delete List From Group:

Add List To Group:


Free Files

Path\Filename of free files (may include wildcards):


File Security

Info about Additional Download Restrictions:

If you include a PATH (such as C:\POWRBBS\FILES\*.*), this PATH will be available to ALL callers with the given Access, though they might not be in your file lists!  If you do not include a PATH, such as *.ZIP this applies to all downloads on your BBS.

Info about Additional Upload Restrictions:

Path\Filename of files (may include wildcards):

Minimum Access:

Password:


File Manager

Group Combobox:

List ComboBox:

Delete File(s):

Move File(s):

Edit File(s):

Use FILEDIZ:

Clear Selected:

Select ALL:

Header:

Sort by Name, Ascending:

Sort by Name, Descending:

Sort by Date, Ascending:

Sort by Date, Descending:


Overview

Every node of PowerBBS that you run requires a separate POWRBBS.DAT file.  The most common way to name these DAT files is POWRBBS1.DAT, POWRBBS2.DAT where the number is the number of the node.  You will use these DAT files to start up a separate instance of PowerBBS - one instance of PowerBBS per DAT file.  In simple terms this means that you will have a separate icon to start PowerBBS for each node you run on your system.  If you are running two nodes of PowerBBS then you will start PowerBBS twice - once for each DAT file.

PowerTip - If you intend to run more than one node of PowerBBS, configure the one node first and make sure everything is running to your satisfaction.  Adding a second node will be as simple as copying the first node's DAT file, then making a few changes to items that must be different on each node.

Multiple Nodes:

Be sure to read the chapter in the manual on running multiple nodes.  Inside the Modem/Node information section you will find a page on Node Information.  This is the only information that needs to be different for each node you operate.

Working with Config:

Config operates like a standard WIndows program.  There is an icon for each set of entries in Config.  Click once on an icon to see and edit the options associated with that icon.  You may also choose to get to these options from the menus.  Either method works and is acceptable.

File Menu:

Open will allow you to pick a file and open it for editing in Config.  By default Config lists those files ending with the extension .DAT.  There are other files on your system with this same extension, but they are not the actual DAT files for use with Config.  You have to close the current DAT file before you can open another.

Close will close the currently open DAT file, and all associated files that have been edited.  If there is no file open then this item will be gray and inaccessible.

Save will save the currently open DAT file, and all associated files that have been edited.

Save As will let you save the currently open DAT file with another name.

Exit exits the program.

PowerTip-  If you are planning to make a lot of changes in Config, use File, Save As and name the file with the extension BAK to save a backup.  Then use File, Open to open the original DAT file and make your changes.  If you mess up, you can always open the BAK file and try again!

Navigating the Configuration Program:

Whenever there is a check box for an option, checked indicates that the option is selected on "ON".  If you leave the box blank, that option is not selected or "OFF".  The term clear means to uncheck a check box.  We use the term clear because that's what Microsoft uses.  Besides that, uncheck sounds a little silly!